% Define page layout

% The following are U.K. LaTeX settings and should be changed for U.S.
% paper formats.

\textheight=22cm
\textwidth=16cm
\topmargin=0cm
\oddsidemargin=0.cm
\evensidemargin=0.cm

% These are corresponding U.S. settings commented out.

% \textheight 8.in
% \textwidth 6.5 in

% Define the font to print Mathematica commands \mmafont
\newfont{\mmafont}{cmtt12}

% Define the macro to print Mathematica commands \mma{}
\newcommand{\mma}[1]{{\mmafont #1}}

% Define mathematical symbols
\font\bbb=msbm10
\def\real{\hbox{\bbb R}}
\def\natural{\hbox{\bbb N}}
\def\integer{\hbox{\bbb Z}}
\def\rational{\hbox{\bbb Q}}
\def\complex{\hbox{\bbb C}}

\def\quotes{{\tt "}}

% define bold greek letters for math mode
% usage:: ${\bmit \eta }$

\font\bitgrfont=cmmib10
\textfont9=\bitgrfont
\def\bmit{\fam=9}
\mathchardef\eta="7111
